%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%
% 水曜日用
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%\Day{月を書いてください}{日にちを書いてください}{水}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\Day{3}{25}{水}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%\AID{ArxiveのIDを入れる(ex. 1234.5678)  空白を置かないように注意！}
%\Dai{タイトル}
%\Chosha{著者}
%\Comments{コメント}
%\Subjects{ex. Earth and Planetary Astrophysics (astro-ph.EP)}
%\Setsumei{理論, 観測, 実験 etc.}
%{
%	コメント
%}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\AID{2003.10852}
\Dai{TESS spots a hot Jupiter with an inner transiting Neptune}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Huang\%2C+C+X}{Chelsea X. Huang}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Quinn\%2C+S+N}{Samuel N. Quinn}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Vanderburg\%2C+A}{Andrew Vanderburg}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Becker\%2C+J}{Juliette Becker}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Rodriguez\%2C+J+E}{Joseph E. Rodriguez}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Pozuelos\%2C+F+J}{Francisco J. Pozuelos}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Gandolfi\%2C+D}{Davide Gandolfi}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Zhou\%2C+G}{George Zhou}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Mann\%2C+A+W}{Andrew W. Mann}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Collins\%2C+K+A}{Karen A. Collins}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Crossfield\%2C+I}{Ian Crossfield}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Barkaoui\%2C+K}{Khalid Barkaoui}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Collins\%2C+K+I}{Kevin I. Collins}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Fridlund\%2C+M}{Malcolm Fridlund}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Gillon\%2C+M}{Micha\"{e}l Gillon}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Gonzales\%2C+E+J}{Erica J. Gonzales}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=G\%C3\%BCnther\%2C+M+N}{Maximilian N. G\"{u}nther}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Henry\%2C+T+J}{Todd J. Henry}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Howell\%2C+S+B}{Steve B. Howell}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=James\%2C+H}{Hodari-Sadiki James}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jao\%2C+W}{Wei-Chun Jao}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jehin\%2C+E}{Emmanu\"{e}l Jehin}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jensen\%2C+E+L+N}{Eric L. N. Jensen}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Kane\%2C+S+R}{Stephen R. Kane}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Lissauer\%2C+J+J}{Jack J. Lissauer}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Matthews\%2C+E}{Elisabeth Matthews}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Matson\%2C+R+A}{Rachel A. Matson}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Paredes\%2C+L+A}{Leonardo A. Paredes}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Schlieder\%2C+J+E}{Joshua E. Schlieder}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Stassun\%2C+K+G}{Keivan G. Stassun}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Shporer\%2C+A}{Avi Shporer}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Sha\%2C+L}{Lizhou Sha}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Tan\%2C+T}{Thiam-Guan Tan}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Georgieva\%2C+I}{Iskra Georgieva}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Mathur\%2C+S}{Savita Mathur}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Palle\%2C+E}{Enric Palle}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Persson\%2C+C+M}{Carina M. Persson}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Van+Eylen\%2C+V}{Vincent Van Eylen}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Ricker\%2C+G+R}{George R. Ricker}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Vanderspek\%2C+R+K}{Roland K. Vanderspek}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Latham\%2C+D+W}{David W. Latham}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Winn\%2C+J+N}{Joshua N. Winn}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Seager\%2C+S}{S. Seager}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jenkins\%2C+J+M}{Jon M. Jenkins}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Burke\%2C+C+J}{Christopher J. Burke}}
\Comments{accepted by ApJL }
\Subjects{Earth and Planetary Astrophysics (astro-ph.EP); Solar and Stellar Astrophysics (astro-ph.SR)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10545}
\Dai{Potassium Isotope Compositions of Carbonaceous and Ordinary Chondrites:  Implications on the Origin of Volatile Depletion in the Early Solar System}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Bloom\%2C+H}{Hannah Bloom}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Lodders\%2C+K}{Katharina Lodders}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Chen\%2C+H}{Heng Chen}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Zhao\%2C+C}{Chen Zhao}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Tian\%2C+Z}{Zhen Tian}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Koefoed\%2C+P}{Piers Koefoed}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Peto\%2C+M+K}{Maria K. Peto}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jiang\%2C+Y}{Yun Jiang}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Wang\%2C+K}{Kun Wang}}
\Comments{71 pages, 2 tables, 9 figures }
\Subjects{Earth and Planetary Astrophysics (astro-ph.EP)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10451}
\Dai{The TESS-Keck Survey I: A Warm Sub-Saturn-Mass Planet and a Caution  about Stray Light in TESS Cameras}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Dalba\%2C+P+A}{Paul A. Dalba}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Gupta\%2C+A+F}{Arvind F. Gupta}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Rodriguez\%2C+J+E}{Joseph E. Rodriguez}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Dragomir\%2C+D}{Diana Dragomir}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Huang\%2C+C+X}{Chelsea X. Huang}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Kane\%2C+S+R}{Stephen R. Kane}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Quinn\%2C+S+N}{Samuel N. Quinn}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Bieryla\%2C+A}{Allyson Bieryla}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Esquerdo\%2C+G+A}{Gilbert A. Esquerdo}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Fulton\%2C+B+J}{Benjamin J. Fulton}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Scarsdale\%2C+N}{Nicholas Scarsdale}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Batalha\%2C+N+M}{Natalie M. Batalha}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Crossfield\%2C+I+J+M}{Ian J. M. Crossfield}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Dressing\%2C+C+D}{Courtney D. Dressing}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Howard\%2C+A+W}{Andrew W. Howard}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Huber\%2C+D}{Daniel Huber}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Isaacson\%2C+H}{Howard Isaacson}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Petigura\%2C+E+A}{Erik A. Petigura}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Robertson\%2C+P}{Paul Robertson}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Roy\%2C+A}{Arpita Roy}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Weiss\%2C+L+M}{Lauren M. Weiss}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Knudstrup\%2C+E}{Emil Knudstrup}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Andersen\%2C+M+F}{Mads F. Andersen}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Grundahl\%2C+F}{Frank Grundahl}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Yao\%2C+X}{Xinyu Yao}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Pepper\%2C+J}{Joshua Pepper}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Villanueva\%2C+S}{Steven Villanueva Jr.}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Ciardi\%2C+D+R}{David R. Ciardi}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Cloutier\%2C+R}{Ryan Cloutier}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jacobs\%2C+T+L}{Thomas Lee Jacobs}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Kristiansen\%2C+M+H}{Martti H. Kristiansen}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=LaCourse\%2C+D+M}{Daryll M. LaCourse}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Lendl\%2C+M}{Monika Lendl}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Osborn\%2C+H+P}{Hugh P. Osborn}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Palle\%2C+E}{Enric Palle}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Stassun\%2C+K+G}{Keivan G. Stassun}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Stevens\%2C+D+J}{Daniel J. Stevens}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Ricker\%2C+G+R}{George R. Ricker}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Vanderspek\%2C+R}{Roland Vanderspek}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Latham\%2C+D+W}{David W. Latham}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Seager\%2C+S}{S. Seager}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Winn\%2C+J+N}{Joshua N. Winn}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Jenkins\%2C+J+M}{Jon M. Jenkins}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Caldwell\%2C+D+A}{Douglas A. Caldwell}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Daylan\%2C+T}{Tansu Daylan}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Fong\%2C+W}{William Fong}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Goeke\%2C+R+F}{Robert F. Goeke}}
\Comments{17 pages, 9 figures, 4 tables. Resubmitted to AAS Journals following a positive referee report }
\Subjects{Earth and Planetary Astrophysics (astro-ph.EP); Instrumentation and Methods for Astrophysics (astro-ph.IM); Solar and Stellar Astrophysics (astro-ph.SR)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10949}
\Dai{New ultracool dwarf neighbours within 20pc from Gaia DR2}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Scholz\%2C+R}{Ralf-Dieter Scholz}}
\Comments{accepted for publication in Astronomy and Astrophysics, 15 pages, 3 tables, 10 figures (reduced in size) }
\Subjects{Solar and Stellar Astrophysics (astro-ph.SR); Earth and Planetary Astrophysics (astro-ph.EP); Astrophysics of Galaxies (astro-ph.GA)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10792}
\Dai{Evolving grain-size distributions embedded in gas flows}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Sumpter\%2C+R}{Rosie Sumpter}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Van+Loo\%2C+S}{Sven Van Loo}}
\Comments{11 pages, 8 figures, accepted for publication in Monthly Notices of the Royal Astronomical Society }
\Subjects{Astrophysics of Galaxies (astro-ph.GA); Earth and Planetary Astrophysics (astro-ph.EP); Solar and Stellar Astrophysics (astro-ph.SR)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10450}
\Dai{An Isolated White Dwarf with 317-Second Rotation and Magnetic Emission}
\Chosha{\href{http://arxiv.org/search/astro-ph?searchtype=author&query=Reding\%2C+J+S}{Joshua S. Reding}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Hermes\%2C+J+J}{J. J. Hermes}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Vanderbosch\%2C+Z}{Z. Vanderbosch}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Dennihy\%2C+E}{E. Dennihy}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Kaiser\%2C+B+C}{B. C. Kaiser}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Mace\%2C+C+B}{C. B. Mace}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Dunlap\%2C+B+H}{B. H. Dunlap}, \href{http://arxiv.org/search/astro-ph?searchtype=author&query=Clemens\%2C+J+C}{J. C. Clemens}}
\Comments{11 pages, 6 figures, 3 tables. Accepted for publication in ApJ }
\Subjects{Solar and Stellar Astrophysics (astro-ph.SR); Earth and Planetary Astrophysics (astro-ph.EP)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}

\AID{2003.10437}
\Dai{Rock Classification in Petrographic Thin Section Images Based on  Concatenated Convolutional Neural Networks}
\Chosha{\href{http://arxiv.org/search/eess?searchtype=author&query=Su\%2C+C}{Cheng Su}, \href{http://arxiv.org/search/eess?searchtype=author&query=Xu\%2C+S}{Sheng-jia Xu}, \href{http://arxiv.org/search/eess?searchtype=author&query=Zhu\%2C+K}{Kong-yang Zhu}, \href{http://arxiv.org/search/eess?searchtype=author&query=Zhang\%2C+X}{Xiao-can Zhang}}
\Subjects{Image and Video Processing (eess.IV); Earth and Planetary Astrophysics (astro-ph.EP)}
\Setsumei{理論/観測/実験 etc....}
{
	Comment!!!!
}
